; Interface.def : Declares the module parameters for the DLL.

LIBRARY      "Interface"
DESCRIPTION  'Interface Windows Dynamic Link Library'

EXPORTS
	RegisterBehaviorDeclarations
	CKGetPluginInfo
	CKGetPluginInfoCount
