; SelectionSetManager.def : Declares the module parameters for the DLL.

DESCRIPTION  'SelectionSet for VirtoolsDev Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	RegisterBehaviorDeclarations
	CKGetPluginInfo
	CKGetPluginInfoCount
